39,5 40,0 40,5 41,0 41,5

y (m m )

42,0

42,5

43,0

43,5

44,0

x (mm)

38,0 38,5 39,0 39,5

40,5

41,0

41,5

42,0

42,5

36,5 37,0 37,5 38,0

39,5

40,0

40,5

41,0

41,5

x (mm)

39,0 39,5 40,0 40,5 41,0

y (m m )

41,5

42,0

42,5

43,0

43,5

A

D C

B